\subsection{Measurement Techniques}

\begin{itemize}
	\item Control panel allows inserting test images, screenshots, saving bound coordinates, changing program behaviour
	\item For more automated tests, a basic scripting language is implemented
	\item It has goto
\end{itemize}
