\chapter{Results}

\section{Results}

\subsection{Control of System}

\subsection{Design of GUI}

\subsection{Security and User Management}


\section{Recommendations}

\subsection{Approach and Integration}

\subsection{Hardware Control}

\subsection{Detect Loss of Power}

\subsection{Detect Program Crashes}

\subsection{Image Processing}

\subsection{GUI Design}

\subsection{BeagleBone/Server Configuration}

\subsection{Security and User Management}



\subsection{Debugging and Testing}



\section{Conclusions}

This report has described the work of the software team on the MCTX3420 pressurised can project during Semester 2, 2013 at UWA.



