\chapter{Results and Discussion}

\section{Scanning Electron Microscopy}

% Model of structure
Nanostructured metal films prepared at low pressure are often approximated by an isotropic layer of spherical blobs upon the substrate, or even as a uniform layer with an ``effective'' thickness \cite{}. As the right image in Figure \ref{SEM_images} shows, this is a good representation of the structure of such a film. In contrast, the metallic-black film is highly non-uniform; as a result, detailed characterisation of the properties of such a film is difficult.

\section{Total Current Spectropy}

\section{Variable Angle Spectroscopy Ellipsometry}

\section{Optical Transmission Spectroscopy}


